<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">LIBRARY usbcamd2.sys
EXPORTS
DllUnload@0
USBCAMD_AdapterReceivePacket@16
USBCAMD_ControlVendorCommand@36
;USBCAMD_Debug_LogEntry
USBCAMD_DriverEntry@20
USBCAMD_GetRegistryKeyValue@20
USBCAMD_InitializeNewInterface@16
USBCAMD_SelectAlternateInterface@8
</pre></body></html>